SET NAMES utf8mb4;
SET
FOREIGN_KEY_CHECKS = 0;


INSERT INTO sample_system_info VALUES ('fa2359a0e7ca4857b5a2800a2916ac19', 'CRON_PARA', '{\"sample\":\"1 1/10 * * * ?3*21\",\"ssoTicket\":\"24 1/6 * * * ?\",\"sysInfo\":\"16 2/5 * * * ?1*2\"}', '2021-07-07 16:00:22', 'system', b'0');

INSERT INTO sample_system_log VALUES ('4f7a22621c0341eb9c2cc7b1ae9effe5', '停止调度器SYS_INFO', '127.0.0.1', 'SYSTEM', '2021-07-12 14:45:18', 'admin');

INSERT INTO sample_unit VALUES ('root', 1, '顶级单位', '0', NULL, 0, '0');

INSERT INTO sample_role VALUES ('admin', NULL, 1, '系统管理员', 1, 'root');
INSERT INTO sample_role VALUES ('default', NULL, 2, 'default', 1, 'root');

INSERT INTO sample_user VALUES ('admin', 'peream@gmail.com', '89056115', 'admin', b'1', '13691517931', '管理员', 'gly', 'ba3253876aed6bc22d4a6ff53d8406c6ad864195ed144ab5c87621b6c233b548baeae6956df346ec8c17f5ea10f35ee3cbc514797ed7ddd3145464e2a0bab413', 'NORMAL', '8905571712', 'admin', 'root');


INSERT INTO `sample_interface` VALUES ('root', '接口根目录', 'root', 'DIR', '-1', '0', 'HEAD', 0, NULL, 'admin', '2024-01-21 16:41:27');
INSERT INTO `sample_interface` VALUES ('xtgl', '系统管理', 'root_xtgl', 'DIR', 'root', '0-1', 'HEAD', 1, NULL, 'admin', '2024-01-21 16:41:27');
INSERT INTO `sample_interface` VALUES ('xtgl_cdgl', '菜单管理', 'xtgl_cdgl', 'DIR', 'xtgl', '0-1-5', 'HEAD', 50, NULL, 'admin', '2024-01-21 17:05:39');
INSERT INTO `sample_interface` VALUES ('xtgl_cdgl_ckcd', '查看菜单', 'acl/menu/get/{id}', 'API', 'xtgl_cdgl', '0-1-5-6', 'GET', 56, NULL, 'admin', '2024-01-21 17:08:39');
INSERT INTO `sample_interface` VALUES ('xtgl_cdgl_sccd', '删除菜单', 'acl/menu/delete', 'API', 'xtgl_cdgl', '0-1-5-5', 'POST', 55, NULL, 'admin', '2024-01-21 17:08:39');
INSERT INTO `sample_interface` VALUES ('xtgl_cdgl_tjcd', '添加下级菜单', 'acl/menu/add', 'API', 'xtgl_cdgl', '0-1-5-3', 'POST', 53, NULL, 'admin', '2024-01-21 17:08:39');
INSERT INTO `sample_interface` VALUES ('xtgl_cdgl_xgcd', '修改菜单', 'acl/menu/update', 'API', 'xtgl_cdgl', '0-1-5-4', 'POST', 54, NULL, 'admin', '2024-01-21 17:08:39');
INSERT INTO `sample_interface` VALUES ('xtgl_cdgl_yclb', '菜单管理_右侧列表', 'acl/menu/queryPage', 'API', 'xtgl_cdgl', '0-1-5-2', 'POST', 52, NULL, 'admin', '2024-01-21 17:08:39');
INSERT INTO `sample_interface` VALUES ('xtgl_cdgl_zcs', '菜单管理_左侧树', 'acl/menu/getByParentId', 'API', 'xtgl_cdgl', '0-1-5-1', 'POST', 51, NULL, 'admin', '2024-01-21 17:08:39');
INSERT INTO `sample_interface` VALUES ('xtgl_czrz', '操作日志', 'system/oplog', 'DIR', 'xtgl', '0-1-7', 'HEAD', 500, NULL, 'admin', '2024-01-01 00:00:00');
INSERT INTO `sample_interface` VALUES ('xtgl_czrz_cx', '操作日志_查询', 'system/oplog/manage', 'API', 'xtgl_czrz', '0-1-7-1', 'POST', 501, NULL, 'admin', '2024-01-01 00:00:00');
INSERT INTO `sample_interface` VALUES ('xtgl_ddgl', '调度管理', 'xtgl_ddgl', 'DIR', 'xtgl', '0-1-3', 'HEAD', 30, NULL, 'admin', '2024-01-01 00:00:00');
INSERT INTO `sample_interface` VALUES ('xtgl_ddrw', '调度任务', 'xtgl_ddrw', 'DIR', 'xtgl_ddgl', '0-1-3-1', 'HEAD', 31, NULL, 'admin', '2024-01-01 00:00:00');
INSERT INTO `sample_interface` VALUES ('xtgl_ddrw_plqd', '调度任务_批量启动', 'system/cron/startall', 'API', 'xtgl_ddrw', '0-1-3-1-2', 'POST', 32, NULL, 'admin', '2024-01-01 00:00:00');
INSERT INTO `sample_interface` VALUES ('xtgl_ddrw_pltz', '调度任务_批量停止', 'system/cron/stopall', 'API', 'xtgl_ddrw', '0-1-3-1-3', 'POST', 33, NULL, 'admin', '2024-01-01 00:00:00');
INSERT INTO `sample_interface` VALUES ('xtgl_ddrw_post', '调度任务_查询', 'system/cron/manage', 'API', 'xtgl_ddrw', '0-1-3-1-1', 'POST', 32, NULL, 'admin', '2024-01-01 00:00:00');
INSERT INTO `sample_interface` VALUES ('xtgl_ddrz', '调度日志', 'xtgl_ddrz', 'DIR', 'xtgl_ddgl', '0-1-3-2', 'HEAD', 36, NULL, 'admin', '2024-01-01 00:00:00');
INSERT INTO `sample_interface` VALUES ('xtgl_ddrz_cx', '调度日志_查询', 'system/schedulelog/manage', 'API', 'xtgl_ddrz', '0-1-3-2-1', 'POST', 37, NULL, 'admin', '2024-01-01 00:00:00');
INSERT INTO `sample_interface` VALUES ('xtgl_dwgl', '单位管理', 'xtgl_dwgl', 'DIR', 'xtgl', '0-1-1', 'HEAD', 10, NULL, 'admin', '2024-01-21 16:56:06');
INSERT INTO `sample_interface` VALUES ('xtgl_dwgl_add_post', '单位管理_添加', 'acl/unit/add', 'API', 'xtgl_dwgl', '0-1-1-2', 'POST', 12, NULL, 'admin', '2024-01-01 00:00:00');
INSERT INTO `sample_interface` VALUES ('xtgl_dwgl_cx', '单位管理_查询', 'acl/unit/manage', 'API', 'xtgl_dwgl', '0-1-1-1', 'POST', 11, NULL, 'admin', '2024-01-21 17:08:39');
INSERT INTO `sample_interface` VALUES ('xtgl_dwgl_del_post', '单位管理_删除', 'acl/unit/delete/{id}', 'API', 'xtgl_dwgl', '0-1-1-4', 'POST', 14, NULL, 'admin', '2024-01-01 00:00:00');
INSERT INTO `sample_interface` VALUES ('xtgl_dwgl_fidcx', '单位管理_根据父Id获取树形结构', 'acl/unit/getByParent', 'API', 'xtgl_dwgl', '0-1-1-5', 'POST', 15, NULL, 'admin', '2024-01-21 17:08:39');
INSERT INTO `sample_interface` VALUES ('xtgl_dwgl_mod_post', '单位管理_修改', 'acl/unit/edit', 'API', 'xtgl_dwgl', '0-1-1-3', 'POST', 13, NULL, 'admin', '2024-01-01 00:00:00');
INSERT INTO `sample_interface` VALUES ('xtgl_jkgl', '接口管理', 'xtgl_jkgl', 'DIR', 'xtgl', '0-1-4', 'HEAD', 40, NULL, 'admin', '2024-01-21 17:05:39');
INSERT INTO `sample_interface` VALUES ('xtgl_jkgl_ckjk', '查看接口', 'acl/interface/get/{id}', 'API', 'xtgl_jkgl', '0-1-4-8', 'GET', 48, NULL, 'admin', '2024-01-21 17:08:39');
INSERT INTO `sample_interface` VALUES ('xtgl_jkgl_scjk', '删除接口', 'acl/interface/delete', 'API', 'xtgl_jkgl', '0-1-4-7', 'POST', 47, NULL, 'admin', '2024-01-21 17:08:39');
INSERT INTO `sample_interface` VALUES ('xtgl_jkgl_tjjk', '添加接口', 'acl/interface/addInterface', 'API', 'xtgl_jkgl', '0-1-4-5', 'POST', 45, NULL, 'admin', '2024-01-21 17:08:39');
INSERT INTO `sample_interface` VALUES ('xtgl_jkgl_tjml', '添加下级目录', 'acl/interface/addDir', 'API', 'xtgl_jkgl', '0-1-4-3', 'POST', 43, NULL, 'admin', '2024-01-21 17:08:39');
INSERT INTO `sample_interface` VALUES ('xtgl_jkgl_xgjk', '修改接口', 'acl/interface/updateInterface', 'API', 'xtgl_jkgl', '0-1-4-6', 'POST', 46, NULL, 'admin', '2024-01-21 17:08:39');
INSERT INTO `sample_interface` VALUES ('xtgl_jkgl_xgml', '修改目录', 'acl/interface/updateDir', 'API', 'xtgl_jkgl', '0-1-4-4', 'POST', 44, NULL, 'admin', '2024-01-21 17:08:39');
INSERT INTO `sample_interface` VALUES ('xtgl_jkgl_yclb', '接口管理_右侧列表', 'acl/interface/queryPage', 'API', 'xtgl_jkgl', '0-1-4-2', 'POST', 42, NULL, 'admin', '2024-01-21 17:08:39');
INSERT INTO `sample_interface` VALUES ('xtgl_jkgl_zcs', '接口管理_左侧树', 'acl/interface/getByParentId', 'API', 'xtgl_jkgl', '0-1-4-1', 'POST', 41, NULL, 'admin', '2024-01-21 17:08:39');
INSERT INTO `sample_interface` VALUES ('xtgl_jsgl', '角色管理', 'xtgl_jsgl', 'DIR', 'xtgl', '0-1-6', 'HEAD', 90, NULL, 'admin', '2024-01-01 00:00:00');
INSERT INTO `sample_interface` VALUES ('xtgl_jsgl_add_post', '角色管理_添加', 'acl/role/add', 'API', 'xtgl_jsgl', '0-1-6-2', 'POST', 92, NULL, 'admin', '2024-01-01 00:00:00');
INSERT INTO `sample_interface` VALUES ('xtgl_jsgl_conf_interface', '角色管理_配置接口get', 'acl/auth/confInterface/{id}', 'API', 'xtgl_jsgl', '0-1-6-7', 'GET', 97, NULL, 'admin', '2024-01-01 00:00:00');
INSERT INTO `sample_interface` VALUES ('xtgl_jsgl_conf_interface_post', '角色管理_配置接口', 'acl/auth/confInterface', 'API', 'xtgl_jsgl', '0-1-6-8', 'POST', 98, NULL, 'admin', '2024-01-01 00:00:00');
INSERT INTO `sample_interface` VALUES ('xtgl_jsgl_conf_menu', '角色管理_配置菜单get', 'acl/auth/confMenu/{id}', 'API', 'xtgl_jsgl', '0-1-6-5', 'GET', 95, NULL, 'admin', '2024-01-01 00:00:00');
INSERT INTO `sample_interface` VALUES ('xtgl_jsgl_conf_menu_post', '角色管理_配置菜单', 'acl/auth/confMenu', 'API', 'xtgl_jsgl', '0-1-6-6', 'POST', 96, NULL, 'admin', '2024-01-01 00:00:00');
INSERT INTO `sample_interface` VALUES ('xtgl_jsgl_cx', '角色管理_查询', 'acl/role/manage', 'API', 'xtgl_jsgl', '0-1-6-1', 'POST', 91, NULL, 'admin', '2024-01-01 00:00:00');
INSERT INTO `sample_interface` VALUES ('xtgl_jsgl_del', '角色管理_删除', 'acl/role/delete/{id}', 'API', 'xtgl_jsgl', '0-1-6-4', 'POST', 94, NULL, 'admin', '2024-01-01 00:00:00');
INSERT INTO `sample_interface` VALUES ('xtgl_jsgl_getall', '角色管理_获取所有', 'acl/role/getAll', 'API', 'xtgl_jsgl', '0-1-6-9', 'POST', 99, NULL, 'admin', '2024-01-01 00:00:00');
INSERT INTO `sample_interface` VALUES ('xtgl_jsgl_mod_post', '角色管理_修改', 'acl/role/edit', 'API', 'xtgl_jsgl', '0-1-6-3', 'POST', 93, NULL, 'admin', '2024-01-01 00:00:00');
INSERT INTO `sample_interface` VALUES ('xtgl_yhgl', '用户管理', 'xtgl_yhgl', 'DIR', 'xtgl', '0-1-2', 'HEAD', 20, NULL, 'admin', '2024-01-21 16:56:06');
INSERT INTO `sample_interface` VALUES ('xtgl_yhgl_add_post', '用户管理_添加', 'acl/user/add', 'API', 'xtgl_yhgl', '0-1-2-2', 'POST', 22, NULL, 'admin', '2024-01-01 00:00:00');
INSERT INTO `sample_interface` VALUES ('xtgl_yhgl_ckyh', '用户管理_查看', 'acl/user/view/{id}', 'API', 'xtgl_yhgl', '0-1-2-5', 'GET', 25, NULL, 'admin', '2024-01-01 00:00:00');
INSERT INTO `sample_interface` VALUES ('xtgl_yhgl_cx', '用户管理_查询', 'acl/user/manage', 'API', 'xtgl_yhgl', '0-1-2-1', 'POST', 21, NULL, 'admin', '2024-01-01 00:00:00');
INSERT INTO `sample_interface` VALUES ('xtgl_yhgl_mod_post', '用户管理_修改', 'acl/user/edit', 'API', 'xtgl_yhgl', '0-1-2-3', 'POST', 23, NULL, 'admin', '2024-01-01 00:00:00');
INSERT INTO `sample_interface` VALUES ('xtgl_yhgl_status', '用户管理_状态', 'acl/user/status/{id}/{status}', 'API', 'xtgl_yhgl', '0-1-2-4', 'POST', 24, NULL, 'admin', '2024-01-01 00:00:00');


INSERT INTO `sample_menu` VALUES ('root', '根节点', 'root', 'root', 'FIRST_MENU', '-1', NULL, 0, 'admin', '2024-01-20 15:49:34');
INSERT INTO `sample_menu` VALUES ('xtgl', '系统管理', 'system', 'Layout', 'FIRST_MENU', 'root', 'fa fa-cog', 0, 'admin', '2024-01-20 15:52:16');
INSERT INTO `sample_menu` VALUES ('xtgl_cdgl', '菜单管理', 'system/menu', 'system/menu', 'SUB_MENU', 'xtgl', '', 50, 'admin', '2024-01-20 15:56:02');
INSERT INTO `sample_menu` VALUES ('xtgl_czrz', '操作日志', 'system/oplog', 'system/oplog', 'SUB_MENU', 'xtgl', '', 500, 'admin', '2024-01-20 15:56:02');
INSERT INTO `sample_menu` VALUES ('xtgl_ddgl', '调度管理', 'system/schedule', 'ParentView', 'SUB_MENU', 'xtgl', '', 30, 'admin', '2024-01-20 15:56:02');
INSERT INTO `sample_menu` VALUES ('xtgl_ddrw', '调度任务', 'system/schedule/task', 'system/schedule/task', 'SUB_MENU', 'xtgl_ddgl', '', 32, 'admin', '2024-01-20 15:56:02');
INSERT INTO `sample_menu` VALUES ('xtgl_ddrz', '调度日志', 'system/schedule/tasklog', 'system/schedule/tasklog', 'SUB_MENU', 'xtgl_ddgl', '', 33, 'admin', '2024-01-20 15:56:02');
INSERT INTO `sample_menu` VALUES ('xtgl_dwgl', '单位管理', 'system/unit', 'system/unit', 'SUB_MENU', 'xtgl', '', 10, 'admin', '2024-01-20 16:15:44');
INSERT INTO `sample_menu` VALUES ('xtgl_jkgl', '接口管理', 'system/interface', 'system/interface', 'SUB_MENU', 'xtgl', '', 40, 'admin', '2024-01-20 15:56:02');
INSERT INTO `sample_menu` VALUES ('xtgl_jsgl', '角色管理', 'system/role', 'system/role', 'SUB_MENU', 'xtgl', '', 80, 'admin', '2024-01-20 15:56:02');
INSERT INTO `sample_menu` VALUES ('xtgl_yhgl', '用户管理', 'system/user', 'system/user', 'SUB_MENU', 'xtgl', '', 20, 'admin', '2024-01-20 15:56:02');
INSERT INTO `sample_menu` VALUES ('xtgl_yhgl_add', '用户管理_添加', 'system/user/add', 'system/user/add', 'BUTTON', 'xtgl_yhgl', NULL, 21, 'admin', '2024-01-22 14:21:41');

SET FOREIGN_KEY_CHECKS = 1;
